PCBNAME=BOT                                                                             
&I.TYPE=MCX                                                                             
&I.COMMENT=                                                                             
&I.EXEC=000000000000000000000000000000                                                  
&I.TRNS=000000000000000000000000000000                                                  
&I.COND=000000000000000000000000000000                                                  
&I.NZL =0000000000000000000000000000000000000000000000000000000000000000                
End_OF_id
&B.BAD                                                                                  
&B.DSP                                                                                  
&B.DSM                                                                                  
&B.DSL                                                                                  
&B.DSC                                                                                  
&B.FID                                                                                  
&B.MNT                                                                                  
  -42.54   138.93     0.00     0.00 0000000100FF000001000000 C13                        
  -52.07   141.60     0.00    90.00 0000000100FF000001000000 C15                        
   11.43   156.84     0.00   270.00 0000000100FF000001000000 C17                        
   26.03   147.95     0.00   180.00 0000000100FF000001000000 C18                        
   11.43   150.49     0.00   270.00 0000000100FF000001000000 C19                        
   35.56   161.29     0.00    90.00 0000000100FF000001000000 C20                        
   16.51   171.45     0.00   180.00 0000000100FF000001000000 C21                        
   11.43   164.46     0.00   270.00 0000000100FF000001000000 C22                        
   31.75   116.84     0.00   270.00 0000000100FF000001000000 C23                        
   24.76   132.71     0.00    90.00 0000000100FF000001000000 C24                        
   31.75     8.25     0.00   270.00 0000000100FF000001000000 C25                        
   24.76    24.13     0.00    90.00 0000000100FF000001000000 C26                        
   11.43    48.26     0.00   270.00 0000000100FF000001000000 C27                        
   26.03    39.37     0.00   180.00 0000000100FF000001000000 C28                        
   11.43    41.91     0.00   270.00 0000000100FF000001000000 C29                        
   35.56    52.70     0.00    90.00 0000000100FF000001000000 C30                        
   16.51    62.86     0.00   180.00 0000000100FF000001000000 C31                        
   11.43    55.88     0.00   270.00 0000000100FF000001000000 C32                        
   11.43    16.51     0.00   270.00 0000000100FF000001000000 C33                        
   26.03     7.62     0.00   180.00 0000000100FF000001000000 C34                        
   11.43    10.16     0.00   270.00 0000000100FF000001000000 C35                        
   21.59    62.86     0.00   180.00 0000000100FF000001000000 C36                        
   16.51    31.11     0.00   180.00 0000000100FF000001000000 C37                        
   11.43    24.13     0.00   270.00 0000000100FF000001000000 C38                        
   35.56    20.95     0.00    90.00 0000000100FF000001000000 C40                        
   21.59    31.11     0.00   180.00 0000000100FF000001000000 C42                        
   21.59   139.70     0.00   180.00 0000000100FF000001000000 C45                        
   21.59   171.45     0.00   180.00 0000000100FF000001000000 C46                        
   29.84   116.84     0.00   270.00 0000000100FF000001000000 C47                        
   29.84     8.25     0.00   270.00 0000000100FF000001000000 C48                        
  -27.94   161.29     0.00     0.00 0000000100FF000001000000 C49                        
  -27.94   154.94     0.00   180.00 0000000100FF000001000000 C50                        
  -45.08   161.29     0.00   180.00 0000000100FF000001000000 C52                        
  -60.32   161.29     0.00   180.00 0000000100FF000001000000 C53                        
  -36.83   135.89     0.00   180.00 0000000100FF000001000000 C55                        
  -27.94   135.89     0.00     0.00 0000000100FF000001000000 C56                        
  -60.32   142.24     0.00   180.00 0000000100FF000001000000 C59                        
  -60.32   135.89     0.00     0.00 0000000100FF000001000000 C60                        
  -47.62   135.00     0.00   180.00 0000000100FF000001000000 C61                        
  -83.18   216.53     0.00   270.00 0000000100FF000001000000 C62                        
  -66.67   221.61     0.00    90.00 0000000100FF000001000000 C63                        
  -78.10   226.06     0.00   180.00 0000000100FF000001000000 C64                        
  -28.57   248.28     0.00     0.00 0000000100FF000001000000 C65                        
  -60.96   256.54     0.00     0.00 0000000100FF000001000000 C66                        
  -60.96   273.68     0.00   180.00 0000000100FF000001000000 C68                        
  -51.43   273.68     0.00     0.00 0000000100FF000001000000 C69                        
  -28.57   265.43     0.00   180.00 0000000100FF000001000000 C70                        
  -41.27   273.68     0.00     0.00 0000000100FF000001000000 C71                        
  -28.57   273.68     0.00   180.00 0000000100FF000001000000 C72                        
  -43.18   248.28     0.00     0.00 0000000100FF000001000000 C73                        
  -60.96   248.28     0.00   180.00 0000000100FF000001000000 C74                        
   33.02   221.61     0.00   270.00 0000000100FF000001000000 C75                        
   33.02   229.87     0.00   270.00 0000000100FF000001000000 C76                        
   23.49   234.95     0.00     0.00 0000000100FF000001000000 C77                        
   33.02   244.47     0.00   270.00 0000000100FF000001000000 C78                        
   33.02   252.73     0.00   270.00 0000000100FF000001000000 C79                        
   23.49   257.81     0.00     0.00 0000000100FF000001000000 C80                        
   23.49   212.09     0.00     0.00 0000000100FF000001000000 C81                        
   33.02   207.01     0.00   270.00 0000000100FF000001000000 C82                        
   33.02   198.75     0.00   270.00 0000000100FF000001000000 C83                        
   33.02   267.33     0.00   270.00 0000000100FF000001000000 C84                        
   33.02   275.59     0.00   270.00 0000000100FF000001000000 C85                        
   23.49   280.67     0.00     0.00 0000000100FF000001000000 C86                        
   33.02   290.19     0.00   270.00 0000000100FF000001000000 C87                        
   33.02   298.45     0.00   270.00 0000000100FF000001000000 C88                        
   23.49   303.53     0.00     0.00 0000000100FF000001000000 C89                        
 -104.14   134.62     0.00   270.00 0000000100FF000001000000 C98                        
  -93.98   134.62     0.00    90.00 0000000100FF000001000000 C99                        
 -116.84   242.57     0.00   180.00 0000000100FF000001000000 C100                       
 -116.84   252.73     0.00     0.00 0000000100FF000001000000 C101                       
 -108.58   134.62     0.00    90.00 0000000100FF000001000000 C102                       
 -118.74   134.62     0.00   270.00 0000000100FF000001000000 C103                       
 -116.84   271.78     0.00   180.00 0000000100FF000001000000 C104                       
 -116.84   257.17     0.00   180.00 0000000100FF000001000000 C105                       
 -116.84   267.33     0.00     0.00 0000000100FF000001000000 C106                       
 -116.84   281.94     0.00     0.00 0000000100FF000001000000 C107                       
  -73.66   182.24     0.00   180.00 0000000100FF000001000000 C109                       
  -82.55   187.32     0.00    90.00 0000000100FF000001000000 C110                       
  -94.74   111.76     0.00    90.00 0000000100FF000001000000 C111                       
 -104.14   111.76     0.00   270.00 0000000100FF000001000000 C112                       
 -108.58   111.76     0.00    90.00 0000000100FF000001000000 C113                       
 -118.74   111.76     0.00   270.00 0000000100FF000001000000 C114                       
 -123.19   134.62     0.00    90.00 0000000100FF000001000000 C115                       
 -133.35   134.62     0.00   270.00 0000000100FF000001000000 C116                       
 -137.79   134.62     0.00    90.00 0000000100FF000001000000 C117                       
 -147.95   134.62     0.00   270.00 0000000100FF000001000000 C118                       
  -93.98    88.90     0.00    90.00 0000000100FF000001000000 C119                       
 -104.14    88.90     0.00   270.00 0000000100FF000001000000 C120                       
 -108.58    88.90     0.00    90.00 0000000100FF000001000000 C121                       
 -118.74    88.90     0.00   270.00 0000000100FF000001000000 C122                       
 -152.40   134.62     0.00    90.00 0000000100FF000001000000 C123                       
 -162.56   134.62     0.00   270.00 0000000100FF000001000000 C124                       
 -167.00   134.62     0.00    90.00 0000000100FF000001000000 C125                       
 -177.16   134.62     0.00   270.00 0000000100FF000001000000 C126                       
 -123.19    88.90     0.00    90.00 0000000100FF000001000000 C127                       
 -133.35    88.90     0.00   270.00 0000000100FF000001000000 C128                       
 -137.79    88.90     0.00    90.00 0000000100FF000001000000 C129                       
 -147.95    88.90     0.00   270.00 0000000100FF000001000000 C130                       
 -152.40   111.76     0.00    90.00 0000000100FF000001000000 C131                       
 -162.56   111.76     0.00   270.00 0000000100FF000001000000 C132                       
 -167.00   111.76     0.00    90.00 0000000100FF000001000000 C133                       
 -177.16   111.76     0.00   270.00 0000000100FF000001000000 C134                       
 -123.19   111.76     0.00    90.00 0000000100FF000001000000 C135                       
 -133.35   111.76     0.00   270.00 0000000100FF000001000000 C136                       
 -137.79   111.76     0.00    90.00 0000000100FF000001000000 C137                       
 -147.95   111.76     0.00   270.00 0000000100FF000001000000 C138                       
 -152.40    88.90     0.00    90.00 0000000100FF000001000000 C139                       
 -162.56    88.90     0.00   270.00 0000000100FF000001000000 C140                       
 -167.00    88.90     0.00    90.00 0000000100FF000001000000 C141                       
 -177.16    88.90     0.00   270.00 0000000100FF000001000000 C142                       
   -2.92   318.77     0.00   270.00 0000000100FF000001000000 C153                       
  -18.66   318.77     0.00    90.00 0000000100FF000001000000 C154                       
  -20.70   318.77     0.00   270.00 0000000100FF000001000000 C157                       
  -36.44   318.77     0.00    90.00 0000000100FF000001000000 C158                       
  -38.48   318.77     0.00   270.00 0000000100FF000001000000 C161                       
  -54.22   318.77     0.00    90.00 0000000100FF000001000000 C162                       
   51.43   318.77     0.00    90.00 0000000100FF000001000000 C163                       
   41.27   318.77     0.00   270.00 0000000100FF000001000000 C164                       
   26.67   318.77     0.00   270.00 0000000100FF000001000000 C165                       
   36.83   318.77     0.00    90.00 0000000100FF000001000000 C166                       
   12.06   318.77     0.00   270.00 0000000100FF000001000000 C167                       
   22.22   318.77     0.00    90.00 0000000100FF000001000000 C168                       
 -107.31   321.94     0.00   180.00 0000000100FF000001000000 C169                       
 -107.31   336.55     0.00   180.00 0000000100FF000001000000 C170                       
  -93.34   336.55     0.00   180.00 0000000100FF000001000000 C171                       
  -74.93   336.55     0.00     0.00 0000000100FF000001000000 C172                       
 -107.31   312.42     0.00     0.00 0000000100FF000001000000 C173                       
  -74.93   312.42     0.00     0.00 0000000100FF000001000000 C174                       
  -94.23   312.42     0.00   180.00 0000000100FF000001000000 C175                       
  -84.45   312.42     0.00   180.00 0000000100FF000001000000 C176                       
  -74.93   331.47     0.00     0.00 0000000100FF000001000000 C177                       
  -27.94   109.85     0.00     0.00 0000000100FF000001000000 C179                       
  -27.94    84.45     0.00     0.00 0000000100FF000001000000 C180                       
  -27.94   103.50     0.00   180.00 0000000100FF000001000000 C181                       
  -60.32   109.85     0.00   180.00 0000000100FF000001000000 C182                       
  -45.08   109.85     0.00   180.00 0000000100FF000001000000 C183                       
  -60.32    90.80     0.00     0.00 0000000100FF000001000000 C185                       
  -60.32    84.45     0.00     0.00 0000000100FF000001000000 C186                       
  -47.62    84.45     0.00   180.00 0000000100FF000001000000 C187                       
  -36.83    84.45     0.00   180.00 0000000100FF000001000000 C188                       
 -227.96   233.04     0.00    90.00 0000000100FF000001000000 C255                       
 -227.96   246.38     0.00    90.00 0000000100FF000001000000 C256                       
 -230.50   218.44     0.00     0.00 0000000100FF000001000000 C257                       
 -238.76   218.44     0.00   180.00 0000000100FF000001000000 C258                       
 -260.98   248.28     0.00    90.00 0000000100FF000001000000 C259                       
 -247.01   250.82     0.00     0.00 0000000100FF000001000000 C260                       
 -260.98   220.34     0.00    90.00 0000000100FF000001000000 C261                       
 -260.98   227.33     0.00   270.00 0000000100FF000001000000 C262                       
 -260.98   236.22     0.00   270.00 0000000100FF000001000000 C263                       
 -227.96   225.42     0.00   270.00 0000000100FF000001000000 C264                       
 -168.02   164.33     0.00    90.00 0000000100FF000001000000 C278                       
 -179.70   169.54     0.00   270.00 0000000100FF000001000000 C279                       
 -175.89   160.65     0.00   270.00 0000000100FF000001000000 C280                       
  -93.34   194.31     0.00    90.00 0000000100FF000001000000 C281                       
 -109.85   189.23     0.00   270.00 0000000100FF000001000000 C283                       
 -105.41   160.65     0.00   270.00 0000000100FF000001000000 C284                       
 -105.41   169.54     0.00   270.00 0000000100FF000001000000 C285                       
  -97.53   164.33     0.00    90.00 0000000100FF000001000000 C286                       
 -121.03   164.33     0.00    90.00 0000000100FF000001000000 C287                       
 -128.90   160.65     0.00   270.00 0000000100FF000001000000 C288                       
 -128.90   169.54     0.00   270.00 0000000100FF000001000000 C289                       
 -144.52   164.33     0.00    90.00 0000000100FF000001000000 C290                       
 -152.40   169.54     0.00   270.00 0000000100FF000001000000 C291                       
 -152.40   160.65     0.00   270.00 0000000100FF000001000000 C292                       
 -151.76   184.78     0.00    90.00 0000000100FF000001000000 C306                       
 -151.76   195.58     0.00    90.00 0000000100FF000001000000 C307                       
 -151.76   207.01     0.00    90.00 0000000100FF000001000000 C308                       
 -151.76   219.07     0.00    90.00 0000000100FF000001000000 C309                       
 -177.16   184.78     0.00    90.00 0000000100FF000001000000 C310                       
 -177.16   194.94     0.00    90.00 0000000100FF000001000000 C311                       
 -177.16   207.01     0.00    90.00 0000000100FF000001000000 C312                       
 -177.16   219.07     0.00    90.00 0000000100FF000001000000 C313                       
 -116.20   224.15     0.00   180.00 0000000100FF000001000000 C314                       
  -93.34   220.34     0.00   270.00 0000000100FF000001000000 C315                       
  -98.42   191.13     0.00   180.00 0000000100FF000001000000 C316                       
  -98.42   193.04     0.00   180.00 0000000100FF000001000000 C317                       
  -93.34   216.53     0.00    90.00 0000000100FF000001000000 C318                       
 -100.96   226.06     0.00   270.00 0000000100FF000001000000 C319                       
 -103.50   188.59     0.00   270.00 0000000100FF000001000000 C320                       
  -98.42   187.32     0.00     0.00 0000000100FF000001000000 C321                       
   11.43   118.74     0.00   270.00 0000000100FF000001000000 C322                       
   35.56   129.54     0.00    90.00 0000000100FF000001000000 C323                       
   26.03   116.20     0.00   180.00 0000000100FF000001000000 C324                       
   11.43   125.09     0.00   270.00 0000000100FF000001000000 C325                       
   11.43   132.71     0.00   270.00 0000000100FF000001000000 C326                       
   16.51   139.70     0.00   180.00 0000000100FF000001000000 C327                       
  -70.48   327.02     0.00   180.00 0000000100FF000001000000 C328                       
   23.49   163.19     0.00   180.00 0000000100FF000001000000 C329                       
 -114.93   116.84     0.00   180.00 0000000100FF000001000000 C330                       
 -144.14   139.70     0.00   180.00 0000000100FF000001000000 C331                       
 -114.93    93.98     0.00   180.00 0000000100FF000001000000 C332                       
 -173.35   139.70     0.00   180.00 0000000100FF000001000000 C333                       
 -144.14    93.98     0.00   180.00 0000000100FF000001000000 C334                       
 -173.35   116.84     0.00   180.00 0000000100FF000001000000 C335                       
 -144.14   116.84     0.00   180.00 0000000100FF000001000000 C336                       
 -173.35    93.98     0.00   180.00 0000000100FF000001000000 C337                       
 -114.93   139.70     0.00   180.00 0000000100FF000001000000 C338                       
 -109.85   280.67     0.00    90.00 0000000100FF000001000000 C339                       
 -111.76   280.67     0.00    90.00 0000000100FF000001000000 C340                       
   -2.92   325.12     0.00   270.00 0000000100FF000001000000 C345                       
  -95.88   220.34     0.00    90.00 0000000100FF000001000000 C350                       
 -104.77   226.06     0.00    90.00 0000000100FF000001000000 C351                       
  -78.86   329.56     0.00   180.00 0000000100FF000001000000 C353                       
  -50.16   256.54     0.00   180.00 0000000100FF000001000000 C354                       
   23.49   307.97     0.00   180.00 0000000100FF000001000000 C357                       
   24.13   287.65     0.00    90.00 0000000100FF000001000000 C358                       
 -100.33   116.84     0.00     0.00 0000000100FF000001000000 C360                       
 -129.54   139.70     0.00     0.00 0000000100FF000001000000 C361                       
 -100.33    93.98     0.00     0.00 0000000100FF000001000000 C362                       
 -158.75   139.70     0.00     0.00 0000000100FF000001000000 C363                       
 -129.54    93.98     0.00     0.00 0000000100FF000001000000 C364                       
 -158.75   116.84     0.00     0.00 0000000100FF000001000000 C365                       
 -129.54   116.84     0.00     0.00 0000000100FF000001000000 C366                       
 -158.75    93.98     0.00     0.00 0000000100FF000001000000 C367                       
 -100.33   139.70     0.00     0.00 0000000100FF000001000000 C368                       
 -102.87   209.55     0.00     0.00 0000000100FF000001000000 C370                       
   13.97   286.13     0.00    90.00 0000000100FF000001000000 C372                       
  -65.40   258.44     0.00   180.00 0000000100FF000001000000 C375                       
  -84.45   257.17     0.00     0.00 0000000100FF000001000000 C376                       
 -181.61   155.57     0.00     0.00 0000000100FF000001000000 C377                       
  -77.47   177.16     0.00     0.00 0000000100FF000001000000 C378                       
  -72.39   177.16     0.00   180.00 0000000100FF000001000000 C379                       
   -1.27   315.59     0.00   180.00 0000000100FF000001000000 C382                       
  -31.75   107.31     0.00     0.00 0000000100FF000001000000 C386                       
  -38.73   107.31     0.00   180.00 0000000100FF000001000000 C387                       
  -38.73   105.41     0.00   180.00 0000000100FF000001000000 C388                       
  -43.81    97.02     0.00   180.00 0000000100FF000001000000 C389                       
  -24.76   141.60     0.00   180.00 0000000100FF000001000000 C390                       
  -31.75   105.41     0.00     0.00 0000000100FF000001000000 C391                       
  -31.75   100.96     0.00     0.00 0000000100FF000001000000 C392                       
  -38.10   100.96     0.00   180.00 0000000100FF000001000000 C393                       
  -38.10    99.06     0.00   180.00 0000000100FF000001000000 C394                       
 -181.61   159.38     0.00   180.00 0000000100FF000001000000 C395                       
  -31.75    95.25     0.00     0.00 0000000100FF000001000000 C396                       
  -31.75    99.06     0.00     0.00 0000000100FF000001000000 C397                       
 -121.28   281.94     0.00   180.00 0000000100FF000001000000 C398                       
 -116.20   226.06     0.00   180.00 0000000100FF000001000000 C425                       
 -116.20   222.25     0.00   180.00 0000000100FF000001000000 C426                       
 -116.20   220.34     0.00   180.00 0000000100FF000001000000 C427                       
 -110.49   209.55     0.00     0.00 0000000100FF000001000000 C479                       
   33.02    73.66     0.00     0.00 0000000100FF000001000000 C480                       
   20.95    24.13     0.00    90.00 0000000100FF000001000000 C481                       
  -99.56   168.65     0.00    90.00 0000000100FF000001000000 C484                       
 -142.87   106.93     0.00     0.00 0000000100FF000001000000 C485                       
 -128.27   106.93     0.00     0.00 0000000100FF000001000000 C487                       
   61.59   170.18     0.00   270.00 0000000100FF000001000000 C490                       
   61.59    61.59     0.00   270.00 0000000100FF000001000000 C491                       
 -287.02   340.36     0.00    90.00 0000000100FF000001000000 C495                       
 -296.54   340.36     0.00    90.00 0000000100FF000001000000 C496                       
 -287.02   335.91     0.00   270.00 0000000100FF000001000000 C497                       
 -296.54   335.91     0.00   270.00 0000000100FF000001000000 C498                       
 -296.54   319.40     0.00   270.00 0000000100FF000001000000 C499                       
 -287.02   319.40     0.00   270.00 0000000100FF000001000000 C500                       
 -296.54   323.85     0.00    90.00 0000000100FF000001000000 C501                       
 -287.02   323.85     0.00    90.00 0000000100FF000001000000 C502                       
 -296.54   302.89     0.00   270.00 0000000100FF000001000000 C503                       
 -287.02   302.89     0.00   270.00 0000000100FF000001000000 C504                       
 -296.54   307.34     0.00    90.00 0000000100FF000001000000 C505                       
 -287.02   307.34     0.00    90.00 0000000100FF000001000000 C506                       
 -287.02   290.83     0.00    90.00 0000000100FF000001000000 C507                       
 -296.54   290.83     0.00    90.00 0000000100FF000001000000 C508                       
 -287.02   286.38     0.00   270.00 0000000100FF000001000000 C509                       
 -296.54   286.38     0.00   270.00 0000000100FF000001000000 C510                       
 -296.54   269.87     0.00   270.00 0000000100FF000001000000 C511                       
 -287.02   269.87     0.00   270.00 0000000100FF000001000000 C512                       
 -296.54   274.32     0.00    90.00 0000000100FF000001000000 C513                       
 -287.02   274.32     0.00    90.00 0000000100FF000001000000 C514                       
 -296.54   189.86     0.00   270.00 0000000100FF000001000000 C515                       
 -287.02   189.86     0.00   270.00 0000000100FF000001000000 C516                       
 -296.54   194.31     0.00    90.00 0000000100FF000001000000 C517                       
 -287.02   194.31     0.00    90.00 0000000100FF000001000000 C518                       
 -296.54   155.57     0.00   270.00 0000000100FF000001000000 C519                       
 -287.02   155.57     0.00   270.00 0000000100FF000001000000 C520                       
 -296.54   160.02     0.00    90.00 0000000100FF000001000000 C521                       
 -287.02   160.02     0.00    90.00 0000000100FF000001000000 C522                       
 -181.61   157.48     0.00     0.00 0000000100FF000001000000 C532                       
 -163.19   157.48     0.00   270.00 0000000100FF000001000000 C533                       
 -161.92   163.19     0.00    90.00 0000000100FF000001000000 C534                       
 -181.61   164.46     0.00   180.00 0000000100FF000001000000 C535                       
   58.42   170.18     0.00    90.00 0000000100FF000001000000 R4                         
   58.42    61.59     0.00    90.00 0000000100FF000001000000 R7                         
  -48.26   139.06     0.00   180.00 0000000100FF000001000000 R8                         
  -38.48   138.93     0.00   180.00 0000000100FF000001000000 R9                         
   58.42   117.47     0.00    90.00 0000000100FF000001000000 R13                        
   58.42   122.55     0.00    90.00 0000000100FF000001000000 R16                        
   58.42   127.00     0.00    90.00 0000000100FF000001000000 R17                        
   58.42   132.08     0.00    90.00 0000000100FF000001000000 R20                        
   58.42   136.52     0.00    90.00 0000000100FF000001000000 R21                        
   58.42   141.60     0.00    90.00 0000000100FF000001000000 R24                        
   58.42   146.05     0.00    90.00 0000000100FF000001000000 R25                        
   58.42   151.13     0.00    90.00 0000000100FF000001000000 R28                        
   58.42     8.89     0.00    90.00 0000000100FF000001000000 R29                        
   58.42    13.97     0.00    90.00 0000000100FF000001000000 R32                        
   58.42    18.41     0.00    90.00 0000000100FF000001000000 R33                        
   58.42    23.49     0.00    90.00 0000000100FF000001000000 R36                        
   58.42    27.94     0.00    90.00 0000000100FF000001000000 R37                        
   58.42    33.02     0.00    90.00 0000000100FF000001000000 R40                        
   58.42    37.46     0.00    90.00 0000000100FF000001000000 R41                        
   58.42    42.54     0.00    90.00 0000000100FF000001000000 R44                        
   58.42   155.57     0.00    90.00 0000000100FF000001000000 R45                        
   58.42   160.65     0.00    90.00 0000000100FF000001000000 R48                        
   58.42   165.10     0.00    90.00 0000000100FF000001000000 R49                        
   58.42    46.99     0.00    90.00 0000000100FF000001000000 R52                        
   58.42    52.07     0.00    90.00 0000000100FF000001000000 R55                        
   58.42    56.51     0.00    90.00 0000000100FF000001000000 R56                        
   22.86   132.71     0.00    90.00 0000000100FF000001000000 R59                        
   31.75    12.06     0.00    90.00 0000000100FF000001000000 R60                        
   24.76    19.68     0.00   270.00 0000000100FF000001000000 R61                        
   26.03   121.92     0.00   270.00 0000000100FF000001000000 R64                        
   26.03    13.33     0.00   270.00 0000000100FF000001000000 R67                        
   31.75   120.65     0.00    90.00 0000000100FF000001000000 R68                        
   29.84   120.65     0.00    90.00 0000000100FF000001000000 R69                        
   29.84    12.06     0.00    90.00 0000000100FF000001000000 R70                        
  -94.74   115.82     0.00    90.00 0000000100FF000001000000 R71                        
 -123.19   138.68     0.00    90.00 0000000100FF000001000000 R72                        
  -93.98    92.96     0.00    90.00 0000000100FF000001000000 R73                        
 -152.40   138.68     0.00    90.00 0000000100FF000001000000 R74                        
 -123.19    92.96     0.00    90.00 0000000100FF000001000000 R75                        
 -152.40   115.82     0.00    90.00 0000000100FF000001000000 R76                        
 -123.19   115.82     0.00    90.00 0000000100FF000001000000 R77                        
 -152.40    92.96     0.00    90.00 0000000100FF000001000000 R78                        
  -93.98   138.68     0.00    90.00 0000000100FF000001000000 R79                        
  -46.35   177.80     0.00    90.00 0000000100FF000001000000 R80                        
  -48.89   177.80     0.00    90.00 0000000100FF000001000000 R81                        
  -51.43   177.80     0.00    90.00 0000000100FF000001000000 R82                        
  -53.97   177.80     0.00    90.00 0000000100FF000001000000 R83                        
   26.67   132.71     0.00   270.00 0000000100FF000001000000 R84                        
   23.49   165.73     0.00     0.00 0000000100FF000001000000 R85                        
   22.86    24.13     0.00   270.00 0000000100FF000001000000 R86                        
   26.67    24.13     0.00   270.00 0000000100FF000001000000 R87                        
 -106.68   281.94     0.00   180.00 0000000100FF000001000000 R88                        
 -116.84   283.84     0.00     0.00 0000000100FF000001000000 R89                        
  -66.67   217.80     0.00    90.00 0000000100FF000001000000 R90                        
 -121.28   271.78     0.00     0.00 0000000100FF000001000000 R97                        
 -121.28   257.17     0.00     0.00 0000000100FF000001000000 R98                        
 -121.28   242.57     0.00     0.00 0000000100FF000001000000 R99                        
 -149.86   207.01     0.00    90.00 0000000100FF000001000000 R100                       
 -149.86   219.07     0.00    90.00 0000000100FF000001000000 R101                       
 -175.26   219.07     0.00    90.00 0000000100FF000001000000 R102                       
 -175.26   207.01     0.00    90.00 0000000100FF000001000000 R103                       
 -175.26   194.94     0.00    90.00 0000000100FF000001000000 R104                       
 -175.26   184.78     0.00    90.00 0000000100FF000001000000 R105                       
 -149.86   184.78     0.00    90.00 0000000100FF000001000000 R106                       
 -149.86   195.58     0.00    90.00 0000000100FF000001000000 R107                       
   24.51   318.77     0.00    90.00 0000000100FF000001000000 R108                       
   -1.27   311.78     0.00     0.00 0000000100FF000001000000 R206                       
 -163.83   163.19     0.00    90.00 0000000100FF000001000000 R207                       
   33.02    77.47     0.00     0.00 0000000100FF000001000000 R208                       
   33.02   285.75     0.00    90.00 0000000100FF000001000000 R209                       
  -46.73   100.07     0.00    90.00 0000000100FF000001000000 R211                       
  -88.26   331.47     0.00   180.00 0000000100FF000001000000 R212                       
 -133.35   107.95     0.00   270.00 0000000100FF000001000000 R213                       
 -147.95   107.95     0.00   270.00 0000000100FF000001000000 R214                       
 -153.67   184.78     0.00   270.00 0000000100FF000001000000 R237                       
 -151.76   191.77     0.00    90.00 0000000100FF000001000000 R238                       
 -151.76   203.20     0.00    90.00 0000000100FF000001000000 R239                       
 -151.76   215.26     0.00    90.00 0000000100FF000001000000 R240                       
 -179.07   184.78     0.00   270.00 0000000100FF000001000000 R241                       
 -177.16   191.13     0.00    90.00 0000000100FF000001000000 R242                       
 -177.16   203.20     0.00    90.00 0000000100FF000001000000 R243                       
 -177.16   215.26     0.00    90.00 0000000100FF000001000000 R244                       
 -120.01   224.15     0.00   180.00 0000000100FF000001000000 R245                       
  -93.34   224.15     0.00   270.00 0000000100FF000001000000 R246                       
 -104.14   193.04     0.00   180.00 0000000100FF000001000000 R247                       
 -104.14   194.94     0.00   180.00 0000000100FF000001000000 R248                       
  -93.34   212.72     0.00    90.00 0000000100FF000001000000 R249                       
 -102.87   226.06     0.00    90.00 0000000100FF000001000000 R250                       
 -105.41   188.59     0.00    90.00 0000000100FF000001000000 R251                       
  -98.42   189.23     0.00     0.00 0000000100FF000001000000 R252                       
  -70.48   329.56     0.00   180.00 0000000100FF000001000000 R253                       
   19.68   164.46     0.00    90.00 0000000100FF000001000000 R254                       
 -118.74   115.82     0.00    90.00 0000000100FF000001000000 R255                       
 -147.95   138.68     0.00    90.00 0000000100FF000001000000 R256                       
 -118.74    92.96     0.00    90.00 0000000100FF000001000000 R257                       
 -177.16   138.68     0.00    90.00 0000000100FF000001000000 R258                       
 -147.95    92.96     0.00    90.00 0000000100FF000001000000 R259                       
 -177.16   115.82     0.00    90.00 0000000100FF000001000000 R260                       
 -147.95   115.82     0.00    90.00 0000000100FF000001000000 R261                       
 -177.16    92.96     0.00    90.00 0000000100FF000001000000 R262                       
 -118.74   138.68     0.00    90.00 0000000100FF000001000000 R263                       
 -106.68   279.40     0.00     0.00 0000000100FF000001000000 R264                       
 -110.74   277.74     0.00     0.00 0000000100FF000001000000 R265                       
   -0.63   325.12     0.00    90.00 0000000100FF000001000000 R268                       
  -88.26   329.56     0.00   180.00 0000000100FF000001000000 R270                       
  -66.67   213.99     0.00   270.00 0000000100FF000001000000 R275                       
  -74.93   329.56     0.00   180.00 0000000100FF000001000000 R305                       
  -45.72   256.54     0.00   180.00 0000000100FF000001000000 R306                       
   26.03   154.30     0.00   270.00 0000000100FF000001000000 R309                       
   26.03    45.72     0.00   270.00 0000000100FF000001000000 R310                       
   23.49   309.88     0.00     0.00 0000000100FF000001000000 R311                       
   24.13   292.10     0.00    90.00 0000000100FF000001000000 R312                       
  -40.64   169.54     0.00   180.00 0000000100FF000001000000 R314                       
  -34.29   127.00     0.00     0.00 0000000100FF000001000000 R317                       
 -104.14   115.82     0.00   270.00 0000000100FF000001000000 R318                       
 -133.35   138.68     0.00   270.00 0000000100FF000001000000 R319                       
 -104.14    92.96     0.00   270.00 0000000100FF000001000000 R320                       
 -162.56   138.68     0.00   270.00 0000000100FF000001000000 R321                       
 -133.35    92.96     0.00   270.00 0000000100FF000001000000 R322                       
 -162.56   115.82     0.00   270.00 0000000100FF000001000000 R323                       
 -133.35   115.82     0.00   270.00 0000000100FF000001000000 R324                       
 -162.56    92.96     0.00   270.00 0000000100FF000001000000 R325                       
 -104.14   138.68     0.00   270.00 0000000100FF000001000000 R326                       
   13.97   290.06     0.00    90.00 0000000100FF000001000000 R329                       
 -106.68   209.55     0.00     0.00 0000000100FF000001000000 R331                       
  -60.96   258.44     0.00   180.00 0000000100FF000001000000 R332                       
  -88.90   257.17     0.00     0.00 0000000100FF000001000000 R333                       
 -185.42   155.57     0.00     0.00 0000000100FF000001000000 R334                       
 -153.67   191.77     0.00    90.00 0000000100FF000001000000 R335                       
  -72.39   175.26     0.00     0.00 0000000100FF000001000000 R336                       
  -77.47   175.26     0.00   180.00 0000000100FF000001000000 R337                       
   -0.63   318.77     0.00    90.00 0000000100FF000001000000 R339                       
   -1.27   313.69     0.00     0.00 0000000100FF000001000000 R345                       
  -42.54   107.31     0.00   180.00 0000000100FF000001000000 R347                       
  -42.54   105.41     0.00   180.00 0000000100FF000001000000 R348                       
  -44.83   100.07     0.00   270.00 0000000100FF000001000000 R349                       
  -27.94   107.31     0.00     0.00 0000000100FF000001000000 R350                       
  -29.21   141.60     0.00   180.00 0000000100FF000001000000 R351                       
  -27.94   105.41     0.00     0.00 0000000100FF000001000000 R352                       
  -41.91   100.96     0.00   180.00 0000000100FF000001000000 R353                       
  -41.91    99.06     0.00   180.00 0000000100FF000001000000 R354                       
 -185.42   159.38     0.00   180.00 0000000100FF000001000000 R355                       
  -27.94   100.96     0.00     0.00 0000000100FF000001000000 R356                       
  -27.94    95.25     0.00     0.00 0000000100FF000001000000 R357                       
  -27.94    99.06     0.00     0.00 0000000100FF000001000000 R358                       
 -125.73   281.94     0.00   180.00 0000000100FF000001000000 R359                       
 -120.01   226.06     0.00   180.00 0000000100FF000001000000 R387                       
 -120.01   222.25     0.00   180.00 0000000100FF000001000000 R388                       
 -120.01   220.34     0.00   180.00 0000000100FF000001000000 R389                       
 -110.49   207.64     0.00   180.00 0000000100FF000001000000 R441                       
   37.46    73.66     0.00     0.00 0000000100FF000001000000 R443                       
   20.95    19.68     0.00    90.00 0000000100FF000001000000 R448                       
  -99.56   164.33     0.00    90.00 0000000100FF000001000000 R457                       
 -137.79   107.95     0.00   270.00 0000000100FF000001000000 R458                       
 -123.19   107.95     0.00   270.00 0000000100FF000001000000 R460                       
   63.50   170.18     0.00   270.00 0000000100FF000001000000 R471                       
   63.50    61.59     0.00   270.00 0000000100FF000001000000 R472                       
  -45.08   159.38     0.00   180.00 0000000100FF000001000000 R482                       
  -43.18   246.38     0.00     0.00 0000000100FF000001000000 R484                       
  -82.55   336.55     0.00     0.00 0000000100FF000001000000 R486                       
 -185.42   157.48     0.00     0.00 0000000100FF000001000000 R500                       
 -161.29   157.48     0.00    90.00 0000000100FF000001000000 R501                       
 -160.02   163.19     0.00   270.00 0000000100FF000001000000 R502                       
 -185.42   164.46     0.00   180.00 0000000100FF000001000000 R503                       
  -62.23   213.04     0.00   270.00 0000000100FF000001000001 R172                       
  -73.34   196.85     0.00   180.00 0000000100FF000001000001 R173                       
  -82.23   182.24     0.00   180.00 0000000100FF000001000001 R174                       
   15.87   221.29     0.00   270.00 0000000100FF000001000001 R175                       
  -79.05   326.89     0.00     0.00 0000000100FF000001000001 R177                       
 -100.64   182.24     0.00     0.00 0000000100FF000001000001 R178                       
  -79.05   323.21     0.00     0.00 0000000100FF000001000001 R180                       
  -73.34   192.40     0.00   180.00 0000000100FF000001000001 R181                       
  -90.80   177.48     0.00    90.00 0000000100FF000001000001 R182                       
   30.98    23.30     0.00    90.00 0000000100FF000001000001 R183                       
   25.08   180.34     0.00   180.00 0000000100FF000001000001 R184                       
  -79.05   320.04     0.00     0.00 0000000100FF000001000001 R186                       
 -170.49   153.67     0.00   180.00 0000000100FF000001000001 R187                       
  -94.93   182.24     0.00   180.00 0000000100FF000001000001 R190                       
 -158.43   323.85     0.00   180.00 0000000100FF000001000001 R192                       
 -211.13   337.82     0.00   180.00 0000000100FF000001000001 R193                       
 -125.09   331.78     0.00   270.00 0000000100FF000001000001 R196                       
 -209.23   321.31     0.00   180.00 0000000100FF000001000001 R197                       
 -183.83   323.85     0.00   180.00 0000000100FF000001000001 R198                       
 -129.22   337.82     0.00     0.00 0000000100FF000001000001 R199                       
 -205.42   337.82     0.00     0.00 0000000100FF000001000001 R277                       
  -59.69   213.04     0.00   270.00 0000000100FF000001000001 R278                       
  -73.34   199.39     0.00   180.00 0000000100FF000001000001 R279                       
  -82.23   179.70     0.00   180.00 0000000100FF000001000001 R280                       
 -209.23   323.85     0.00   180.00 0000000100FF000001000001 R281                       
   15.87   215.58     0.00    90.00 0000000100FF000001000001 R282                       
  -91.12   326.89     0.00   180.00 0000000100FF000001000001 R284                       
 -106.36   182.24     0.00   180.00 0000000100FF000001000001 R285                       
 -158.43   321.31     0.00   180.00 0000000100FF000001000001 R289                       
  -91.12   324.73     0.00   180.00 0000000100FF000001000001 R290                       
  -73.34   189.86     0.00   180.00 0000000100FF000001000001 R291                       
  -90.80   183.19     0.00   270.00 0000000100FF000001000001 R292                       
   28.82    23.30     0.00    90.00 0000000100FF000001000001 R293                       
   25.08   177.80     0.00   180.00 0000000100FF000001000001 R294                       
 -127.63   331.78     0.00   270.00 0000000100FF000001000001 R295                       
 -183.83   321.31     0.00   180.00 0000000100FF000001000001 R297                       
 -129.22   340.36     0.00     0.00 0000000100FF000001000001 R298                       
  -91.12   320.04     0.00   180.00 0000000100FF000001000001 R300                       
 -170.49   151.13     0.00   180.00 0000000100FF000001000001 R301                       
  -93.34   186.37     0.00   270.00 0000000100FF000001000001 R304                       
  -10.79   318.77     0.00   180.00 0000000100FF000001000002 U61                        
  -28.57   318.77     0.00   180.00 0000000100FF000001000002 U62                        
  -46.35   318.77     0.00   180.00 0000000100FF000001000002 U63                        
&B.OPT                                                                                  
&B.ORG                                                                                  
&B.BRD                                                                                  
    0.00     0.00     0.00     0.00 0000000100FF000000000000                            
    0.00     0.00     0.00     0.00 0000000100FF000000000000                            
&B.QED                                                                                  
End_of_BD
&F000=C1005                             
RC0805                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F001=C1005                             
RC1206                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F002=C1005                             
TSOJ32                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
End_of_FD
End_of_MD
