PCBNAME=TOP                                                                             
&I.TYPE=MCX                                                                             
&I.COMMENT=                                                                             
&I.EXEC=000000000000000000000000000000                                                  
&I.TRNS=000000000000000000000000000000                                                  
&I.COND=000000000000000000000000000000                                                  
&I.NZL =0000000000000000000000000000000000000000000000000000000000000000                
End_OF_id
&B.BAD                                                                                  
&B.DSP                                                                                  
&B.DSM                                                                                  
&B.DSL                                                                                  
&B.DSC                                                                                  
&B.FID                                                                                  
&B.MNT                                                                                  
  -51.43    67.31     0.00    90.00 0000000100FF000001000000 U13                        
  -51.43   229.23     0.00   270.00 0000000100FF000001000000 U19                        
  -51.43   255.90     0.00   270.00 0000000100FF000001000000 U20                        
  -51.43   238.12     0.00   270.00 0000000100FF000001000000 U21                        
  -51.43   264.79     0.00   270.00 0000000100FF000001000000 U22                        
  -51.43   247.01     0.00   270.00 0000000100FF000001000000 U23                        
  -51.43   273.68     0.00   270.00 0000000100FF000001000000 U24                        
  -51.43   175.89     0.00    90.00 0000000100FF000001000000 U98                        
  -51.43   118.74     0.00   270.00 0000000100FF000001000001 U1                         
  -51.43   147.32     0.00   270.00 0000000100FF000001000001 U2                         
  -51.43    10.16     0.00   270.00 0000000100FF000001000001 U3                         
  -51.43    38.73     0.00   270.00 0000000100FF000001000001 U4                         
  -51.43   156.84     0.00   270.00 0000000100FF000001000001 U5                         
  -51.43    19.68     0.00   270.00 0000000100FF000001000001 U6                         
  -51.43    48.26     0.00   270.00 0000000100FF000001000001 U7                         
  -51.43   128.27     0.00   270.00 0000000100FF000001000001 U8                         
  -51.43   137.79     0.00   270.00 0000000100FF000001000001 U9                         
  -51.43   166.37     0.00   270.00 0000000100FF000001000001 U10                        
  -51.43    29.21     0.00   270.00 0000000100FF000001000001 U11                        
  -51.43    57.78     0.00   270.00 0000000100FF000001000001 U12                        
  -51.43   282.57     0.00    90.00 0000000100FF000001000001 U25                        
  269.24   207.96     0.00   270.00 0000000100FF000001000002 C305                       
  288.29   254.63     0.00   180.00 0000000100FF000001000003 C271                       
  287.02   227.96     0.00   180.00 0000000100FF000001000003 C272                       
  142.87   309.88     0.00   270.00 0000000100FF000001000003 C494                       
  -66.04   293.37     0.00    90.00 0000000100FF000001000004 U91                        
  290.19   207.01     0.00     0.00 0000000100FF000001000004 U95                        
  -66.04    76.20     0.00    90.00 0000000100FF000001000005 U82                        
  -52.70    -1.90     0.00    90.00 0000000100FF000001000005 U94                        
  -66.04   184.78     0.00    90.00 0000000100FF000001000005 U97                        
  -31.75   184.78     0.00    90.00 0000000100FF000001000006 U14                        
  -31.75    76.20     0.00    90.00 0000000100FF000001000006 U96                        
  184.15   330.83     0.00     0.00 0000000100FF000001000007 U64                        
  158.75   330.83     0.00     0.00 0000000100FF000001000007 U65                        
  209.55   330.83     0.00     0.00 0000000100FF000001000007 U66                        
  133.35   330.83     0.00     0.00 0000000100FF000001000007 U67                        
   74.93   217.80     0.00    90.00 0000000100FF000001000008 XU3                        
  -24.76   203.83     0.00   180.00 0000000100FF000001000008 XU4                        
  -24.76   226.69     0.00   180.00 0000000100FF000001000008 XU5                        
  -24.76   249.55     0.00   180.00 0000000100FF000001000008 XU6                        
  -24.76   295.27     0.00   180.00 0000000100FF000001000008 XU7                        
  -24.76   272.41     0.00   180.00 0000000100FF000001000008 XU8                        
   74.93   190.50     0.00     0.00 0000000100FF000001000008 XU9                        
  101.60   161.92     0.00    90.00 0000000100FF000001000008 XU13                       
  125.09   161.92     0.00    90.00 0000000100FF000001000008 XU14                       
  148.59   161.92     0.00    90.00 0000000100FF000001000008 XU15                       
  101.60   190.50     0.00    90.00 0000000100FF000001000008 XU16                       
  101.60   217.80     0.00    90.00 0000000100FF000001000008 XU17                       
  172.08   161.92     0.00    90.00 0000000100FF000001000008 XU18                       
  -23.49   128.27     0.00     0.00 0000000100FF000001000009 U15                        
  -23.49   160.02     0.00     0.00 0000000100FF000001000009 U16                        
  -23.49    19.68     0.00     0.00 0000000100FF000001000009 U17                        
  -23.49    51.43     0.00     0.00 0000000100FF000001000009 U18                        
   44.48   148.65     0.00   270.00 0000000100FF00000100000A XU1                        
   44.66   260.92     0.00    90.00 0000000100FF00000100000A XU2                        
   91.22   324.54     0.00   270.00 0000000100FF00000100000A XU10                       
   44.46    97.24     0.00   270.00 0000000100FF00000100000A XU11                       
  244.41   234.73     0.00     0.00 0000000100FF00000100000A XU12                       
  -44.45    38.73     0.00    90.00 0000000100FF00000100000B C1                         
  -44.45    19.68     0.00    90.00 0000000100FF00000100000B C2                         
  -44.45    29.21     0.00    90.00 0000000100FF00000100000B C3                         
  -44.45   118.74     0.00    90.00 0000000100FF00000100000B C4                         
  -44.45    57.78     0.00    90.00 0000000100FF00000100000B C5                         
  -59.69    69.85     0.00   180.00 0000000100FF00000100000B C6                         
  -44.45    48.26     0.00    90.00 0000000100FF00000100000B C7                         
  -44.45   156.84     0.00    90.00 0000000100FF00000100000B C8                         
  -44.45   137.79     0.00    90.00 0000000100FF00000100000B C9                         
  -44.45   147.32     0.00    90.00 0000000100FF00000100000B C10                        
  -44.45   128.27     0.00    90.00 0000000100FF00000100000B C11                        
  -44.45   166.37     0.00    90.00 0000000100FF00000100000B C12                        
  -44.45    10.16     0.00    90.00 0000000100FF00000100000B C14                        
  -59.69   178.43     0.00   180.00 0000000100FF00000100000B C16                        
  -38.10    77.47     0.00   270.00 0000000100FF00000100000B C41                        
  -44.57   300.35     0.00    90.00 0000000100FF00000100000B C90                        
  -45.08   254.63     0.00    90.00 0000000100FF00000100000B C91                        
  -45.08   236.85     0.00    90.00 0000000100FF00000100000B C92                        
  -45.08   245.74     0.00    90.00 0000000100FF00000100000B C93                        
  -45.08   227.96     0.00    90.00 0000000100FF00000100000B C94                        
  -45.08   272.41     0.00    90.00 0000000100FF00000100000B C95                        
  -59.05   285.75     0.00   180.00 0000000100FF00000100000B C96                        
  -45.08   263.52     0.00    90.00 0000000100FF00000100000B C97                        
   81.28   201.93     0.00     0.00 0000000100FF00000100000B C108                       
  153.67   184.78     0.00    90.00 0000000100FF00000100000B C143                       
  153.67   196.85     0.00    90.00 0000000100FF00000100000B C144                       
  153.67   208.91     0.00    90.00 0000000100FF00000100000B C145                       
  153.67   220.98     0.00    90.00 0000000100FF00000100000B C146                       
  179.07   184.78     0.00    90.00 0000000100FF00000100000B C147                       
  179.07   196.85     0.00    90.00 0000000100FF00000100000B C148                       
  179.07   208.91     0.00    90.00 0000000100FF00000100000B C149                       
  179.07   220.98     0.00    90.00 0000000100FF00000100000B C150                       
    2.92   318.77     0.00   270.00 0000000100FF00000100000B C151                       
   18.66   318.77     0.00    90.00 0000000100FF00000100000B C152                       
   20.70   318.77     0.00   270.00 0000000100FF00000100000B C155                       
   36.44   318.77     0.00    90.00 0000000100FF00000100000B C156                       
   38.48   318.77     0.00   270.00 0000000100FF00000100000B C159                       
   54.22   318.77     0.00    90.00 0000000100FF00000100000B C160                       
  173.35   332.74     0.00   180.00 0000000100FF00000100000B C189                       
  185.42   320.04     0.00   270.00 0000000100FF00000100000B C192                       
  173.35   330.83     0.00   180.00 0000000100FF00000100000B C193                       
  183.51   320.04     0.00   270.00 0000000100FF00000100000B C194                       
  160.02   320.04     0.00   270.00 0000000100FF00000100000B C197                       
  147.95   332.74     0.00   180.00 0000000100FF00000100000B C199                       
  147.95   330.83     0.00   180.00 0000000100FF00000100000B C201                       
  158.11   320.04     0.00   270.00 0000000100FF00000100000B C202                       
  147.32   312.42     0.00   270.00 0000000100FF00000100000B C206                       
  134.62   320.04     0.00   270.00 0000000100FF00000100000B C208                       
  122.55   332.74     0.00   180.00 0000000100FF00000100000B C210                       
  122.55   330.83     0.00   180.00 0000000100FF00000100000B C211                       
  132.71   320.04     0.00   270.00 0000000100FF00000100000B C212                       
  210.82   320.04     0.00   270.00 0000000100FF00000100000B C216                       
  198.75   332.74     0.00   180.00 0000000100FF00000100000B C218                       
  208.91   320.04     0.00   270.00 0000000100FF00000100000B C219                       
  198.75   330.83     0.00   180.00 0000000100FF00000100000B C220                       
  259.71   309.24     0.00     0.00 0000000100FF00000100000B C251                       
  259.71   328.93     0.00     0.00 0000000100FF00000100000B C252                       
  257.81   138.43     0.00     0.00 0000000100FF00000100000B C253                       
  257.81   157.48     0.00     0.00 0000000100FF00000100000B C254                       
  288.92   223.52     0.00   180.00 0000000100FF00000100000B C270                       
  226.69   120.65     0.00   270.00 0000000100FF00000100000B C273                       
  105.28   202.31     0.00     0.00 0000000100FF00000100000B C282                       
  -68.58   189.86     0.00     0.00 0000000100FF00000100000B C293                       
  -68.58    81.28     0.00     0.00 0000000100FF00000100000B C294                       
  -58.42   186.05     0.00   270.00 0000000100FF00000100000B C295                       
  -58.42    77.47     0.00   270.00 0000000100FF00000100000B C296                       
  -44.45    76.83     0.00   270.00 0000000100FF00000100000B C297                       
  -44.45   185.42     0.00   270.00 0000000100FF00000100000B C298                       
  -52.07   339.72     0.00     0.00 0000000100FF00000100000B C299                       
  -44.57   294.00     0.00   270.00 0000000100FF00000100000B C300                       
  -54.61   189.86     0.00   180.00 0000000100FF00000100000B C301                       
  -54.61    81.28     0.00   180.00 0000000100FF00000100000B C302                       
  -54.61   298.45     0.00   180.00 0000000100FF00000100000B C303                       
  274.95   211.45     0.00   180.00 0000000100FF00000100000B C304                       
  -58.42   294.64     0.00   270.00 0000000100FF00000100000B C342                       
  -68.58   298.45     0.00     0.00 0000000100FF00000100000B C343                       
    2.92   325.12     0.00    90.00 0000000100FF00000100000B C344                       
  -55.88   322.58     0.00   180.00 0000000100FF00000100000B C346                       
  271.78   330.20     0.00     0.00 0000000100FF00000100000B C348                       
  290.83   250.82     0.00   180.00 0000000100FF00000100000B C349                       
  113.03   216.53     0.00    90.00 0000000100FF00000100000B C352                       
  220.34   237.49     0.00     0.00 0000000100FF00000100000B C355                       
  -39.37   193.67     0.00   180.00 0000000100FF00000100000B C356                       
   21.59   262.25     0.00     0.00 0000000100FF00000100000B C369                       
  102.87   205.74     0.00   180.00 0000000100FF00000100000B C371                       
   44.45   282.57     0.00     0.00 0000000100FF00000100000B C373                       
  153.67   191.77     0.00    90.00 0000000100FF00000100000B C374                       
    1.27   311.78     0.00     0.00 0000000100FF00000100000B C381                       
  -55.88   314.96     0.00     0.00 0000000100FF00000100000B C383                       
  132.08   233.04     0.00    90.00 0000000100FF00000100000B C399                       
  133.98   233.04     0.00    90.00 0000000100FF00000100000B C400                       
  137.79   233.04     0.00    90.00 0000000100FF00000100000B C401                       
  139.70   233.04     0.00    90.00 0000000100FF00000100000B C402                       
  143.51   233.04     0.00    90.00 0000000100FF00000100000B C403                       
  147.32   233.04     0.00    90.00 0000000100FF00000100000B C404                       
  151.13   233.04     0.00    90.00 0000000100FF00000100000B C405                       
  153.03   233.04     0.00    90.00 0000000100FF00000100000B C406                       
  149.22   233.04     0.00    90.00 0000000100FF00000100000B C407                       
  145.41   233.04     0.00    90.00 0000000100FF00000100000B C408                       
  135.89   233.04     0.00    90.00 0000000100FF00000100000B C409                       
  141.60   233.04     0.00    90.00 0000000100FF00000100000B C410                       
  154.94   233.04     0.00    90.00 0000000100FF00000100000B C411                       
  157.48   233.04     0.00    90.00 0000000100FF00000100000B C412                       
  159.38   233.04     0.00    90.00 0000000100FF00000100000B C413                       
  163.19   233.04     0.00    90.00 0000000100FF00000100000B C414                       
  165.10   233.04     0.00    90.00 0000000100FF00000100000B C415                       
  168.91   233.04     0.00    90.00 0000000100FF00000100000B C416                       
  172.72   233.04     0.00    90.00 0000000100FF00000100000B C417                       
  176.53   233.04     0.00    90.00 0000000100FF00000100000B C418                       
  178.43   233.04     0.00    90.00 0000000100FF00000100000B C419                       
  174.62   233.04     0.00    90.00 0000000100FF00000100000B C420                       
  170.81   233.04     0.00    90.00 0000000100FF00000100000B C421                       
  161.29   233.04     0.00    90.00 0000000100FF00000100000B C422                       
  167.00   233.04     0.00    90.00 0000000100FF00000100000B C423                       
  180.34   233.04     0.00    90.00 0000000100FF00000100000B C424                       
  184.78   144.78     0.00     0.00 0000000100FF00000100000B C428                       
  184.78   142.24     0.00     0.00 0000000100FF00000100000B C429                       
  184.78   139.70     0.00     0.00 0000000100FF00000100000B C430                       
  184.78   121.92     0.00     0.00 0000000100FF00000100000B C431                       
  184.78   119.38     0.00     0.00 0000000100FF00000100000B C432                       
  184.78   116.84     0.00     0.00 0000000100FF00000100000B C433                       
  184.78    99.06     0.00     0.00 0000000100FF00000100000B C434                       
  184.78    96.52     0.00     0.00 0000000100FF00000100000B C435                       
  184.78    93.98     0.00     0.00 0000000100FF00000100000B C436                       
  184.78   114.30     0.00     0.00 0000000100FF00000100000B C437                       
  192.40   110.49     0.00     0.00 0000000100FF00000100000B C438                       
  192.40   107.95     0.00     0.00 0000000100FF00000100000B C439                       
  192.40   105.41     0.00     0.00 0000000100FF00000100000B C440                       
  192.40   102.87     0.00     0.00 0000000100FF00000100000B C441                       
  184.78   101.60     0.00     0.00 0000000100FF00000100000B C442                       
  184.78   104.14     0.00     0.00 0000000100FF00000100000B C443                       
  184.78   106.68     0.00     0.00 0000000100FF00000100000B C444                       
  184.78   109.22     0.00     0.00 0000000100FF00000100000B C445                       
  184.78   111.76     0.00     0.00 0000000100FF00000100000B C446                       
  192.40   113.03     0.00     0.00 0000000100FF00000100000B C447                       
  192.40   115.57     0.00     0.00 0000000100FF00000100000B C448                       
  192.40   118.11     0.00     0.00 0000000100FF00000100000B C449                       
  192.40   120.65     0.00     0.00 0000000100FF00000100000B C450                       
  184.78    91.44     0.00     0.00 0000000100FF00000100000B C451                       
  192.40    87.63     0.00     0.00 0000000100FF00000100000B C452                       
  192.40    85.09     0.00     0.00 0000000100FF00000100000B C453                       
  192.40    82.55     0.00     0.00 0000000100FF00000100000B C454                       
  192.40    80.01     0.00     0.00 0000000100FF00000100000B C455                       
  184.78    78.74     0.00     0.00 0000000100FF00000100000B C456                       
  184.78    81.28     0.00     0.00 0000000100FF00000100000B C457                       
  184.78    83.82     0.00     0.00 0000000100FF00000100000B C458                       
  184.78    86.36     0.00     0.00 0000000100FF00000100000B C459                       
  184.78    88.90     0.00     0.00 0000000100FF00000100000B C460                       
  192.40    90.17     0.00     0.00 0000000100FF00000100000B C461                       
  192.40    92.71     0.00     0.00 0000000100FF00000100000B C462                       
  192.40    95.25     0.00     0.00 0000000100FF00000100000B C463                       
  192.40    97.79     0.00     0.00 0000000100FF00000100000B C464                       
  184.78   137.16     0.00     0.00 0000000100FF00000100000B C465                       
  192.40   133.35     0.00     0.00 0000000100FF00000100000B C466                       
  192.40   130.81     0.00     0.00 0000000100FF00000100000B C467                       
  192.40   128.27     0.00     0.00 0000000100FF00000100000B C468                       
  192.40   125.73     0.00     0.00 0000000100FF00000100000B C469                       
  184.78   124.46     0.00     0.00 0000000100FF00000100000B C470                       
  184.78   127.00     0.00     0.00 0000000100FF00000100000B C471                       
  184.78   129.54     0.00     0.00 0000000100FF00000100000B C472                       
  184.78   132.08     0.00     0.00 0000000100FF00000100000B C473                       
  184.78   134.62     0.00     0.00 0000000100FF00000100000B C474                       
  192.40   135.89     0.00     0.00 0000000100FF00000100000B C475                       
  192.40   138.43     0.00     0.00 0000000100FF00000100000B C476                       
  192.40   140.97     0.00     0.00 0000000100FF00000100000B C477                       
  192.40   143.51     0.00     0.00 0000000100FF00000100000B C478                       
  -55.24     3.17     0.00   180.00 0000000100FF00000100000B C482                       
  -39.37   195.58     0.00   180.00 0000000100FF00000100000B C483                       
   86.99   174.62     0.00    90.00 0000000100FF00000100000B C486                       
  241.30   211.45     0.00   270.00 0000000100FF00000100000B C488                       
   38.86   238.12     0.00   270.00 0000000100FF00000100000B C489                       
  126.36   309.88     0.00     0.00 0000000100FF00000100000B C492                       
  134.62   309.88     0.00   180.00 0000000100FF00000100000B C493                       
  -46.35    -0.63     0.00   270.00 0000000100FF00000100000B C523                       
  -41.27     3.81     0.00   180.00 0000000100FF00000100000B C524                       
  -37.46    -6.98     0.00     0.00 0000000100FF00000100000B C525                       
  -58.42    -0.63     0.00   270.00 0000000100FF00000100000B C526                       
  -56.51   344.80     0.00   180.00 0000000100FF00000100000B C527                       
  288.92   215.26     0.00     0.00 0000000100FF00000100000B C528                       
  292.73   213.99     0.00    90.00 0000000100FF00000100000B C529                       
  -38.10   186.05     0.00   270.00 0000000100FF00000100000B C530                       
  279.40   211.45     0.00   180.00 0000000100FF00000100000B C531                       
  -44.45    62.86     0.00    90.00 0000000100FF00000100000B R1                         
  -44.45   171.45     0.00    90.00 0000000100FF00000100000B R10                        
  -31.75   179.70     0.00     0.00 0000000100FF00000100000B R11                        
  -31.75    71.12     0.00     0.00 0000000100FF00000100000B R12                        
  -58.42   117.47     0.00   270.00 0000000100FF00000100000B R14                        
  -58.42   122.55     0.00   270.00 0000000100FF00000100000B R15                        
  -58.42   127.00     0.00   270.00 0000000100FF00000100000B R18                        
  -58.42   132.08     0.00   270.00 0000000100FF00000100000B R19                        
  -58.42   136.52     0.00   270.00 0000000100FF00000100000B R22                        
  -58.42   141.60     0.00   270.00 0000000100FF00000100000B R23                        
  -58.42   146.05     0.00   270.00 0000000100FF00000100000B R26                        
  -58.42   151.13     0.00   270.00 0000000100FF00000100000B R27                        
  -58.42     8.89     0.00   270.00 0000000100FF00000100000B R30                        
  -58.42    13.97     0.00   270.00 0000000100FF00000100000B R31                        
  -58.42    18.41     0.00   270.00 0000000100FF00000100000B R34                        
  -58.42    23.49     0.00   270.00 0000000100FF00000100000B R35                        
  -58.42    27.94     0.00   270.00 0000000100FF00000100000B R38                        
  -58.42    33.02     0.00   270.00 0000000100FF00000100000B R39                        
  -58.42    37.46     0.00   270.00 0000000100FF00000100000B R42                        
  -58.42    42.54     0.00   270.00 0000000100FF00000100000B R43                        
  -58.42   155.57     0.00   270.00 0000000100FF00000100000B R46                        
  -58.42   160.65     0.00   270.00 0000000100FF00000100000B R47                        
  -58.42   165.10     0.00   270.00 0000000100FF00000100000B R50                        
  -58.42   170.18     0.00   270.00 0000000100FF00000100000B R51                        
  -58.42    46.99     0.00   270.00 0000000100FF00000100000B R53                        
  -58.42    52.07     0.00   270.00 0000000100FF00000100000B R54                        
  -58.42    56.51     0.00   270.00 0000000100FF00000100000B R57                        
  -58.42    61.59     0.00   270.00 0000000100FF00000100000B R58                        
  -18.41   143.51     0.00     0.00 0000000100FF00000100000B R62                        
  -22.22   111.76     0.00     0.00 0000000100FF00000100000B R63                        
  -19.68    34.92     0.00     0.00 0000000100FF00000100000B R65                        
  -22.22     3.17     0.00     0.00 0000000100FF00000100000B R66                        
  -40.64   245.11     0.00    90.00 0000000100FF00000100000B R91                        
  -57.78   280.67     0.00    90.00 0000000100FF00000100000B R94                        
  -42.54   300.35     0.00    90.00 0000000100FF00000100000B R95                        
  -59.05   283.84     0.00     0.00 0000000100FF00000100000B R96                        
    0.63   318.77     0.00   270.00 0000000100FF00000100000B R109                       
  220.34   235.58     0.00   180.00 0000000100FF00000100000B R111                       
  254.63   327.02     0.00    90.00 0000000100FF00000100000B R200                       
  274.95   332.74     0.00     0.00 0000000100FF00000100000B R201                       
  -64.13   342.90     0.00   180.00 0000000100FF00000100000B R202                       
  249.55   125.73     0.00    90.00 0000000100FF00000100000B R203                       
  -55.88   313.05     0.00   180.00 0000000100FF00000100000B R204                       
    1.27   315.59     0.00   180.00 0000000100FF00000100000B R205                       
  257.81   257.81     0.00   270.00 0000000100FF00000100000B R210                       
  297.18   210.18     0.00   180.00 0000000100FF00000100000B R216                       
  297.18   204.47     0.00     0.00 0000000100FF00000100000B R217                       
  -42.54    76.83     0.00    90.00 0000000100FF00000100000B R221                       
  -69.21    69.21     0.00   270.00 0000000100FF00000100000B R222                       
  -42.54   185.42     0.00    90.00 0000000100FF00000100000B R223                       
  -69.21   177.80     0.00   270.00 0000000100FF00000100000B R224                       
  -52.07   341.63     0.00     0.00 0000000100FF00000100000B R225                       
  -66.67   332.74     0.00    90.00 0000000100FF00000100000B R226                       
  -42.54   294.00     0.00    90.00 0000000100FF00000100000B R227                       
  -69.21   286.38     0.00   270.00 0000000100FF00000100000B R228                       
  -59.05   189.86     0.00   180.00 0000000100FF00000100000B R229                       
  -71.12   177.80     0.00   270.00 0000000100FF00000100000B R230                       
  -71.12    69.21     0.00   270.00 0000000100FF00000100000B R231                       
  -59.05    81.28     0.00   180.00 0000000100FF00000100000B R232                       
  -59.05   298.45     0.00   180.00 0000000100FF00000100000B R233                       
  -71.12   286.38     0.00   270.00 0000000100FF00000100000B R234                       
  273.05   207.64     0.00    90.00 0000000100FF00000100000B R235                       
  274.32   202.56     0.00   180.00 0000000100FF00000100000B R236                       
  -64.13   332.74     0.00   270.00 0000000100FF00000100000B R266                       
    0.63   325.12     0.00   270.00 0000000100FF00000100000B R267                       
  -60.32   322.58     0.00   180.00 0000000100FF00000100000B R269                       
  -43.56   297.30     0.00   180.00 0000000100FF00000100000B R271                       
  -39.37   191.77     0.00   180.00 0000000100FF00000100000B R272                       
  271.78   328.29     0.00   180.00 0000000100FF00000100000B R273                       
  220.34   232.41     0.00   180.00 0000000100FF00000100000B R276                       
  220.34   239.39     0.00   180.00 0000000100FF00000100000B R307                       
  -43.81   193.67     0.00   180.00 0000000100FF00000100000B R308                       
   57.15   234.95     0.00   270.00 0000000100FF00000100000B R313                       
   70.48   160.02     0.00     0.00 0000000100FF00000100000B R315                       
   22.86   161.92     0.00    90.00 0000000100FF00000100000B R316                       
   21.59   260.35     0.00   180.00 0000000100FF00000100000B R327                       
  107.31   205.74     0.00   180.00 0000000100FF00000100000B R328                       
   40.00   282.57     0.00     0.00 0000000100FF00000100000B R330                       
    1.27   309.88     0.00   180.00 0000000100FF00000100000B R338                       
  -60.32   314.96     0.00     0.00 0000000100FF00000100000B R343                       
    1.27   313.69     0.00   180.00 0000000100FF00000100000B R344                       
  -55.88   316.86     0.00   180.00 0000000100FF00000100000B R346                       
  268.60   228.60     0.00     0.00 0000000100FF00000100000B R360                       
  132.08   236.85     0.00    90.00 0000000100FF00000100000B R361                       
  133.98   236.85     0.00    90.00 0000000100FF00000100000B R362                       
  137.79   236.85     0.00    90.00 0000000100FF00000100000B R363                       
  139.70   236.85     0.00    90.00 0000000100FF00000100000B R364                       
  143.51   236.85     0.00    90.00 0000000100FF00000100000B R365                       
  147.32   236.85     0.00    90.00 0000000100FF00000100000B R366                       
  151.13   236.85     0.00    90.00 0000000100FF00000100000B R367                       
  153.03   236.85     0.00    90.00 0000000100FF00000100000B R368                       
  149.22   236.85     0.00    90.00 0000000100FF00000100000B R369                       
  145.41   236.85     0.00    90.00 0000000100FF00000100000B R370                       
  135.89   236.85     0.00    90.00 0000000100FF00000100000B R371                       
  141.60   236.85     0.00    90.00 0000000100FF00000100000B R372                       
  154.94   236.85     0.00    90.00 0000000100FF00000100000B R373                       
  157.48   236.85     0.00    90.00 0000000100FF00000100000B R374                       
  159.38   236.85     0.00    90.00 0000000100FF00000100000B R375                       
  163.19   236.85     0.00    90.00 0000000100FF00000100000B R376                       
  165.10   236.85     0.00    90.00 0000000100FF00000100000B R377                       
  168.91   236.85     0.00    90.00 0000000100FF00000100000B R378                       
  172.72   236.85     0.00    90.00 0000000100FF00000100000B R379                       
  176.53   236.85     0.00    90.00 0000000100FF00000100000B R380                       
  178.43   236.85     0.00    90.00 0000000100FF00000100000B R381                       
  174.62   236.85     0.00    90.00 0000000100FF00000100000B R382                       
  170.81   236.85     0.00    90.00 0000000100FF00000100000B R383                       
  161.29   236.85     0.00    90.00 0000000100FF00000100000B R384                       
  167.00   236.85     0.00    90.00 0000000100FF00000100000B R385                       
  180.34   236.85     0.00    90.00 0000000100FF00000100000B R386                       
  188.59   144.78     0.00     0.00 0000000100FF00000100000B R390                       
  188.59   142.24     0.00     0.00 0000000100FF00000100000B R391                       
  188.59   139.70     0.00     0.00 0000000100FF00000100000B R392                       
  188.59   121.92     0.00     0.00 0000000100FF00000100000B R393                       
  188.59   119.38     0.00     0.00 0000000100FF00000100000B R394                       
  188.59   116.84     0.00     0.00 0000000100FF00000100000B R395                       
  188.59    99.06     0.00     0.00 0000000100FF00000100000B R396                       
  188.59    96.52     0.00     0.00 0000000100FF00000100000B R397                       
  188.59    93.98     0.00     0.00 0000000100FF00000100000B R398                       
  188.59   114.30     0.00     0.00 0000000100FF00000100000B R399                       
  196.21   110.49     0.00     0.00 0000000100FF00000100000B R400                       
  196.21   107.95     0.00     0.00 0000000100FF00000100000B R401                       
  196.21   105.41     0.00     0.00 0000000100FF00000100000B R402                       
  196.21   102.87     0.00     0.00 0000000100FF00000100000B R403                       
  188.59   101.60     0.00     0.00 0000000100FF00000100000B R404                       
  188.59   104.14     0.00     0.00 0000000100FF00000100000B R405                       
  188.59   106.68     0.00     0.00 0000000100FF00000100000B R406                       
  188.59   109.22     0.00     0.00 0000000100FF00000100000B R407                       
  188.59   111.76     0.00     0.00 0000000100FF00000100000B R408                       
  196.21   113.03     0.00     0.00 0000000100FF00000100000B R409                       
  196.21   115.57     0.00     0.00 0000000100FF00000100000B R410                       
  196.21   118.11     0.00     0.00 0000000100FF00000100000B R411                       
  196.21   120.65     0.00     0.00 0000000100FF00000100000B R412                       
  188.59    91.44     0.00     0.00 0000000100FF00000100000B R413                       
  196.21    87.63     0.00     0.00 0000000100FF00000100000B R414                       
  196.21    85.09     0.00     0.00 0000000100FF00000100000B R415                       
  196.21    82.55     0.00     0.00 0000000100FF00000100000B R416                       
  196.21    80.01     0.00     0.00 0000000100FF00000100000B R417                       
  188.59    78.74     0.00     0.00 0000000100FF00000100000B R418                       
  188.59    81.28     0.00     0.00 0000000100FF00000100000B R419                       
  188.59    83.82     0.00     0.00 0000000100FF00000100000B R420                       
  188.59    86.36     0.00     0.00 0000000100FF00000100000B R421                       
  188.59    88.90     0.00     0.00 0000000100FF00000100000B R422                       
  196.21    90.17     0.00     0.00 0000000100FF00000100000B R423                       
  196.21    92.71     0.00     0.00 0000000100FF00000100000B R424                       
  196.21    95.25     0.00     0.00 0000000100FF00000100000B R425                       
  196.21    97.79     0.00     0.00 0000000100FF00000100000B R426                       
  188.59   137.16     0.00     0.00 0000000100FF00000100000B R427                       
  196.21   133.35     0.00     0.00 0000000100FF00000100000B R428                       
  196.21   130.81     0.00     0.00 0000000100FF00000100000B R429                       
  196.21   128.27     0.00     0.00 0000000100FF00000100000B R430                       
  196.21   125.73     0.00     0.00 0000000100FF00000100000B R431                       
  188.59   124.46     0.00     0.00 0000000100FF00000100000B R432                       
  188.59   127.00     0.00     0.00 0000000100FF00000100000B R433                       
  188.59   129.54     0.00     0.00 0000000100FF00000100000B R434                       
  188.59   132.08     0.00     0.00 0000000100FF00000100000B R435                       
  188.59   134.62     0.00     0.00 0000000100FF00000100000B R436                       
  196.21   135.89     0.00     0.00 0000000100FF00000100000B R437                       
  196.21   138.43     0.00     0.00 0000000100FF00000100000B R438                       
  196.21   140.97     0.00     0.00 0000000100FF00000100000B R439                       
  196.21   143.51     0.00     0.00 0000000100FF00000100000B R440                       
  171.45   315.59     0.00    90.00 0000000100FF00000100000B R442                       
  268.60   230.50     0.00     0.00 0000000100FF00000100000B R444                       
  220.34   229.87     0.00   180.00 0000000100FF00000100000B R445                       
  268.60   232.41     0.00     0.00 0000000100FF00000100000B R446                       
  231.14   211.45     0.00   270.00 0000000100FF00000100000B R447                       
  255.90   257.81     0.00    90.00 0000000100FF00000100000B R449                       
  254.00   257.81     0.00    90.00 0000000100FF00000100000B R450                       
  268.60   226.69     0.00     0.00 0000000100FF00000100000B R451                       
  255.90   211.45     0.00   270.00 0000000100FF00000100000B R452                       
  -59.69     3.17     0.00   180.00 0000000100FF00000100000B R453                       
  -43.81   195.58     0.00   180.00 0000000100FF00000100000B R454                       
  233.68   257.17     0.00    90.00 0000000100FF00000100000B R455                       
  257.81   211.45     0.00   270.00 0000000100FF00000100000B R456                       
   88.90   174.62     0.00   270.00 0000000100FF00000100000B R459                       
  234.95   211.45     0.00   270.00 0000000100FF00000100000B R461                       
  268.60   234.31     0.00     0.00 0000000100FF00000100000B R462                       
  241.30   207.01     0.00   270.00 0000000100FF00000100000B R463                       
   36.19   238.12     0.00    90.00 0000000100FF00000100000B R464                       
  233.04   211.45     0.00   270.00 0000000100FF00000100000B R465                       
  220.34   227.96     0.00   180.00 0000000100FF00000100000B R466                       
  220.34   226.06     0.00   180.00 0000000100FF00000100000B R467                       
  268.60   224.79     0.00     0.00 0000000100FF00000100000B R468                       
  297.18   208.28     0.00     0.00 0000000100FF00000100000B R469                       
  297.18   206.37     0.00   180.00 0000000100FF00000100000B R470                       
  252.09   257.81     0.00    90.00 0000000100FF00000100000B R473                       
  279.40   202.56     0.00   180.00 0000000100FF00000100000B R474                       
  -69.85    -1.27     0.00    90.00 0000000100FF00000100000B R475                       
  -45.08     3.81     0.00   180.00 0000000100FF00000100000B R476                       
  -67.31    -1.27     0.00    90.00 0000000100FF00000100000B R477                       
  -64.77    -1.27     0.00    90.00 0000000100FF00000100000B R478                       
  -33.02    -6.98     0.00     0.00 0000000100FF00000100000B R479                       
  -69.21   332.74     0.00    90.00 0000000100FF00000100000B R480                       
  288.92   213.36     0.00   180.00 0000000100FF00000100000B R481                       
   53.97   171.45     0.00     0.00 0000000100FF00000100000B R483                       
   43.81   236.85     0.00   270.00 0000000100FF00000100000B R485                       
   90.17   346.07     0.00   180.00 0000000100FF00000100000B R487                       
  254.00   211.45     0.00   270.00 0000000100FF00000100000B R488                       
  241.30   259.08     0.00    90.00 0000000100FF00000100000B R489                       
  -18.41    66.67     0.00     0.00 0000000100FF00000100000B R490                       
  -18.41   175.26     0.00     0.00 0000000100FF00000100000B R491                       
  295.91   349.25     0.00   180.00 0000000100FF00000100000B R492                       
  291.46   349.25     0.00   180.00 0000000100FF00000100000B R493                       
  295.91    -7.62     0.00   180.00 0000000100FF00000100000B R494                       
  291.46    -7.62     0.00   180.00 0000000100FF00000100000B R495                       
  -31.11   143.51     0.00   180.00 0000000100FF00000100000B R496                       
  -31.11    34.92     0.00   180.00 0000000100FF00000100000B R497                       
  -31.11   175.26     0.00   180.00 0000000100FF00000100000B R498                       
  -31.11    66.67     0.00   180.00 0000000100FF00000100000B R499                       
  247.01    79.69     0.00    90.00 0000000100FF00000100000C R176                       
  -24.13   187.00     0.00   270.00 0000000100FF00000100000C R179                       
  255.90   204.78     0.00   270.00 0000000100FF00000100000C R185                       
   66.67   278.06     0.00    90.00 0000000100FF00000100000C R188                       
  253.36    79.69     0.00    90.00 0000000100FF00000100000C R194                       
  264.79    79.69     0.00    90.00 0000000100FF00000100000C R195                       
  244.47    79.69     0.00    90.00 0000000100FF00000100000C R283                       
  255.90    79.69     0.00    90.00 0000000100FF00000100000C R287                       
  -21.59   187.00     0.00   270.00 0000000100FF00000100000C R288                       
  253.36   204.78     0.00   270.00 0000000100FF00000100000C R296                       
  262.25    79.69     0.00    90.00 0000000100FF00000100000C R299                       
   68.83   278.06     0.00    90.00 0000000100FF00000100000C R302                       
  263.52    71.75     0.00     0.00 0000000100FF00000100000D J4                         
  245.74    71.75     0.00     0.00 0000000100FF00000100000D J5                         
  254.63    71.75     0.00     0.00 0000000100FF00000100000D J6                         
  -51.43    76.20     0.00    90.00 0000000100FF00000100000E U78                        
  -51.43   184.78     0.00    90.00 0000000100FF00000100000E U79                        
  -51.43   293.37     0.00    90.00 0000000100FF00000100000E U80                        
  -40.00    -1.90     0.00    90.00 0000000100FF00000100000E U81                        
  -57.78   338.45     0.00     0.00 0000000100FF00000100000E U93                        
  278.13   207.01     0.00     0.00 0000000100FF00000100000F U83                        
  143.51   187.00     0.00   270.00 0000000100FF000001000010 U47                        
  143.51   199.07     0.00   270.00 0000000100FF000001000010 U48                        
  143.51   211.13     0.00   270.00 0000000100FF000001000010 U49                        
  143.51   223.20     0.00   270.00 0000000100FF000001000010 U50                        
  168.91   187.00     0.00   270.00 0000000100FF000001000010 U51                        
  168.91   199.07     0.00   270.00 0000000100FF000001000010 U52                        
  168.91   211.13     0.00   270.00 0000000100FF000001000010 U53                        
  168.91   223.20     0.00   270.00 0000000100FF000001000010 U54                        
  263.20   318.77     0.00   180.00 0000000100FF000001000011 UA71                       
  261.30   147.95     0.00   180.00 0000000100FF000001000011 UA72                       
  263.20   338.45     0.00   180.00 0000000100FF000001000011 UB71                       
  261.30   167.00     0.00   180.00 0000000100FF000001000011 UB72                       
  291.78   338.13     0.00     0.00 0000000100FF000001000012 U84                        
  291.78   157.79     0.00     0.00 0000000100FF000001000012 U85                        
  291.78   321.62     0.00     0.00 0000000100FF000001000012 U86                        
  291.78   272.09     0.00     0.00 0000000100FF000001000012 U87                        
  291.78   192.08     0.00     0.00 0000000100FF000001000012 U88                        
  291.78   305.11     0.00     0.00 0000000100FF000001000012 U89                        
  291.78   288.60     0.00     0.00 0000000100FF000001000012 U90                        
   99.06   134.62     0.00     0.00 0000000100FF000001000013 U26                        
  113.66   134.62     0.00     0.00 0000000100FF000001000013 U27                        
  116.84   276.86     0.00    90.00 0000000100FF000001000013 U28                        
  116.84   262.25     0.00    90.00 0000000100FF000001000013 U29                        
  116.84   247.65     0.00    90.00 0000000100FF000001000013 U30                        
   99.06   111.76     0.00     0.00 0000000100FF000001000013 U31                        
  113.66   111.76     0.00     0.00 0000000100FF000001000013 U32                        
  142.87    88.90     0.00     0.00 0000000100FF000001000013 U33                        
  128.27    88.90     0.00     0.00 0000000100FF000001000013 U34                        
  128.27   134.62     0.00     0.00 0000000100FF000001000013 U35                        
  142.87   134.62     0.00     0.00 0000000100FF000001000013 U36                        
  172.08   111.76     0.00     0.00 0000000100FF000001000013 U37                        
  157.48   111.76     0.00     0.00 0000000100FF000001000013 U38                        
   99.06    88.90     0.00     0.00 0000000100FF000001000013 U39                        
  113.66    88.90     0.00     0.00 0000000100FF000001000013 U40                        
  142.87   111.76     0.00     0.00 0000000100FF000001000013 U41                        
  128.27   111.76     0.00     0.00 0000000100FF000001000013 U42                        
  172.08   134.62     0.00     0.00 0000000100FF000001000013 U43                        
  157.48   134.62     0.00     0.00 0000000100FF000001000013 U44                        
  172.08    88.90     0.00     0.00 0000000100FF000001000013 U45                        
  157.48    88.90     0.00     0.00 0000000100FF000001000013 U46                        
   10.79   318.77     0.00   180.00 0000000100FF000001000013 U55                        
   28.57   318.77     0.00   180.00 0000000100FF000001000013 U56                        
   46.35   318.77     0.00   180.00 0000000100FF000001000013 U57                        
  -46.35   318.77     0.00   180.00 0000000100FF000001000013 U58                        
  -31.75   318.77     0.00   180.00 0000000100FF000001000013 U59                        
  -17.14   318.77     0.00   180.00 0000000100FF000001000013 U60                        
&B.OPT                                                                                  
&B.ORG                                                                                  
&B.BRD                                                                                  
    0.00     0.00     0.00     0.00 0000000100FF000000000000                            
    0.00     0.00     0.00     0.00 0000000100FF000000000000                            
&B.QED                                                                                  
End_of_BD
&F000=C1005                             
26LS31D                                 
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F001=C1005                             
26LS32D                                 
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F002=C1005                             
CSMPB                                   
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F003=C1005                             
CSMPD                                   
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F004=C1005                             
HC02D                                   
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F005=C1005                             
HC08D                                   
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F006=C1005                             
HC32D                                   
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F007=C1005                             
PLCC32                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F008=C1005                             
PLCC44                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F009=C1005                             
PLCC68                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F010=C1005                             
PQ160SKN                                
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F011=C1005                             
RC0805                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F012=C1005                             
RC1206                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F013=C1005                             
RING                                    
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F014=C1005                             
SOIC16                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F015=C1005                             
SOIC8                                   
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F016=C1005                             
SOJ28                                   
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F017=C1005                             
SOL24                                   
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F018=C1005                             
SSOP48                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
&F019=C1005                             
TSOJ32                                  
NONE                                    
0100000000010000070100000000000000001E1E
00000000000103000000000300050C1E32001E1E
      500      255        7        0    
    0.00     0.00     0.15     0.80     
       1        1        0        0     
       0        0        0        0     
    0.00     0.00     0.00     0.00     
       0        0        0        0     
    0.50     1.00     0.30     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       1        1        0        0     
       0        0        0        0     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    1.00     1.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50     0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.50    -0.50     0.00     0.00     
    0.00     0.00     0.00     0.00     
    0.00     0.00     0.00     0.00     
       1        1        0        0     
       2        2        0        0     
    0.62     1.15     0.00     0.00     
                                        
                                        
End_of_FD
End_of_MD
