dsub

6.099 / 8 Constant 200.7 7.040 Mean -0.2068E-03 0.1691E-03 Sigma 0.5169E-02 0.1765E-03

0

25

50

75

100

125

150

175

200

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125